
DROP TABLE IF EXISTS `mdm_machine_group`;
CREATE TABLE `mdm_machine_group` (
  `id` bigint NOT NULL COMMENT '主键',
  `tenant_id` varchar(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '000000' COMMENT '租户ID',
  `name` varchar(20) CHARACTER SET utf8mb4 DEFAULT NULL COMMENT '机床组名称',
  `code` varchar(20) CHARACTER SET utf8mb4 DEFAULT NULL COMMENT '机床组编号',
  `create_user` bigint DEFAULT NULL COMMENT '创建人',
  `create_dept` bigint DEFAULT NULL COMMENT '创建部门',
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `update_user` bigint DEFAULT NULL COMMENT '修改人',
  `update_time` datetime DEFAULT NULL COMMENT '修改时间',
  `status` int DEFAULT '1' COMMENT '状态',
  `is_deleted` int DEFAULT '0' COMMENT '是否已删除',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci COMMENT='机床组';

DROP TABLE IF EXISTS `mdm_machine`;
CREATE TABLE `mdm_machine` (
  `id` bigint NOT NULL,
  `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
  `code` varchar(100) NOT NULL COMMENT '机床编号',
  `name` varchar(100) NOT NULL COMMENT '机床描述/型号',
  `avatar` varchar(400) DEFAULT NULL COMMENT '图片地址',
  `machine_group_code` varchar(255) NOT NULL COMMENT '所属机床组代码，,在业务字典配置（key=machine_group）',
  `machine_spec` varchar(40) DEFAULT NULL COMMENT '机器规格:01车床/02铣床,在业务字典配置（key=machine_spec）',
  `operator` varchar(100)  COMMENT '操作员，文本录入',
  `owner_dept` bigint DEFAULT NULL COMMENT '所属单位/组织',
  `manufacturer` varchar(100)  COMMENT '生产商',
  `polling_hours` int(11) COMMENT '检查程序回传的轮询时间（小时）',
  `control_system` varchar(20) DEFAULT NULL COMMENT '控制系统（如发那科），在业务字典配置(key=machine_controll_system)，使用英文字母',
  `prog_send_dir` varchar(400)  COMMENT '程序下发目录',
  `send_dir_expiry_hours` int NOT NULL DEFAULT 8 COMMENT 'send文件夹文件有效期（小时)',
  `prog_receive_dir` varchar(400)  COMMENT '程序回传目录',
  `receive_dir_expiry_hours` varchar(255) NOT NULL DEFAULT 8 COMMENT 'receive文件夹文件有效期（小时）',
  `prog_temp_dir` varchar(400)  COMMENT '程序长期存储目录',
  `remark` varchar(200)  COMMENT '备注',
  `status` int DEFAULT NULL COMMENT '业务状态，1：启用；0禁用',
  `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
  `is_deleted` int DEFAULT NULL,
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `create_user` bigint DEFAULT NULL COMMENT '创建人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `update_user` bigint DEFAULT NULL COMMENT '更新人',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE KEY `uniqueCodeIndex` (`code`,`is_deleted`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci  ROW_FORMAT=DYNAMIC COMMENT='机床';


DROP TABLE IF EXISTS `mdm_dbbak_config`;
CREATE TABLE `mdm_dbbak_config` (
    `id` bigint NOT NULL,
    `name` varchar(100) NULL COMMENT '图号，零组件号',
    `ip_addr` varchar(20) NOT NULL COMMENT '专业组长账号',
    `account` varchar(80) NOT NULL COMMENT '数据库账号',
    `passwd` varchar(80) NOT NULL COMMENT '数据库密码',
    `db_name` varchar(80) NOT NULL COMMENT '数据库名称',
    `db_port` int NOT NULL COMMENT '数据库端口',
    `status` int DEFAULT NULL COMMENT '业务状态',
    `is_deleted` int DEFAULT 0,
    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci  ROW_FORMAT=DYNAMIC COMMENT='数据库备份配置';


DROP TABLE IF EXISTS `mdm_qinzhe_fgb`;
CREATE TABLE `mdm_qinzhe_fgb` (
   `cph` varchar(80) NULL COMMENT '产品号',
   `ljh` varchar(80) NULL COMMENT '零件号',
   `ljmc` varchar(100) NULL COMMENT '零件名称',
   `zz` varchar(40) NULL COMMENT '主制',
   `zzgd` varchar(40) NULL COMMENT '主制工段',
   `zggy` varchar(40) NULL COMMENT '主管工艺',
   `fg` varchar(40) NULL COMMENT '副管',
   `cjjhy` varchar(40) NULL COMMENT '车间计划员',
   `jhy` varchar(40) NULL COMMENT '计划员',
   `source` varchar(5) NULL COMMENT '数据来源',
    update_time datetime null  COMMENT '更新时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci  ROW_FORMAT=DYNAMIC COMMENT='勤哲分工表本地临时表';

DROP TABLE IF EXISTS `v_张立虎_2厂主制分工表`;
CREATE TABLE `v_张立虎_2厂主制分工表` (
  `产品号` varchar(40) NULL COMMENT '产品号',
  `零件号` varchar(80) NULL COMMENT '零件号',
  `零件名称` varchar(100) NULL COMMENT '零件名称',
  `主制` varchar(40) NULL COMMENT '主制',
  `零件等级` varchar(40) NULL COMMENT '零件等级',
  `机型` varchar(40) NULL COMMENT '机型',
  `型别` varchar(40) NULL COMMENT '型别',
  `依据` varchar(40) NULL COMMENT '依据',
  `主制工段` varchar(40) NULL COMMENT '主制工段',
  `主管工艺` varchar(40) NULL COMMENT '主管工艺',
  `副管` varchar(40) NULL COMMENT '副管',
  `是否关键件` varchar(40) NULL COMMENT '是否关键件',
  `备注` varchar(40) NULL COMMENT '备注',
  `零件编号` varchar(40) NULL COMMENT '零件编号',
  `车间计划员` varchar(40) NULL COMMENT '车间计划员',
  `计划员` varchar(40) NULL COMMENT '计划员'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci  ROW_FORMAT=DYNAMIC COMMENT='勤哲分工表视图模拟';



DROP TABLE IF EXISTS `mdm_produce_division`;
CREATE TABLE `mdm_produce_division` (
    `id` bigint NOT NULL,
    `team_leader_id` bigint  COMMENT '专业组长账号',
    `programmer_id` bigint  COMMENT '编制员账号',
    `checker_id` bigint COMMENT '校对员账号（工艺员角色）',
    `senior_id` bigint  COMMENT '审批高师账号',
    `tenant_id` varchar(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT '000000' COMMENT '租户ID',
    `status` int DEFAULT NULL COMMENT '业务状态',
    `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
    `is_deleted` int DEFAULT 0,
    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
    `create_user` bigint DEFAULT NULL COMMENT '创建人',
    `update_time` datetime DEFAULT NULL COMMENT '更新时间',
    `update_user` bigint DEFAULT NULL COMMENT '更新人',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci  ROW_FORMAT=DYNAMIC COMMENT='主制分工表';


DROP TABLE IF EXISTS `mdm_nc_node`;
CREATE TABLE `mdm_nc_node` (
   `id` bigint NOT NULL,
   `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
   `name` varchar(100) NOT NULL COMMENT '节点名称',
   `process_name` varchar(20) NULL COMMENT '工序名称',
   `process_no` varchar(100) NULL COMMENT '工序号',
   `machine_code` varchar(100) DEFAULT NULL COMMENT '设备编号/机床编号',
   `drawing_no` varchar(100) NULL COMMENT '零组件编号/图号',
   `is_cured` int DEFAULT NULL COMMENT '是否固化,1是;0否',
   `is_locked` int DEFAULT NULL COMMENT '锁定状态，1：锁定；0:正常',
   `is_last_edition` int NULL COMMENT '是否最新版次，1：最新版次；0:历史版次，主要取该字段=1的数据，0是历史版次',
   `expire_date` date DEFAULT NULL COMMENT '到期时间,根据有效期时长计算而来',
   `process_edition` varchar(40) DEFAULT NULL COMMENT '工序版次，升版就是变更改该字段，需要保留历史记录',
   `craft_edition` varchar(40) DEFAULT NULL COMMENT '工艺版次',
   `drawing_no_edition` varchar(100) NULL COMMENT '图号版次',
   `description` varchar(100) NULL COMMENT '描述',
   `remark` varchar(200) NULL COMMENT '备注',
   `parent_id` bigint DEFAULT NULL COMMENT '上级节点ID',
   `parent_ids` varchar(200) DEFAULT NULL COMMENT '上级节点ID集合，id逗号分隔',
   `node_type` varchar(20) DEFAULT NULL COMMENT '节点类型：业务字典定义',
   `product_model` varchar(100) NULL COMMENT '产品型号',
   `program_no` varchar(20) NULL COMMENT '程序编号,只有程序包名节点才有值',
   `flow_program_file_id` bigint NULL COMMENT '关联的流程程序文件id，程序文件类型的节点才有值',
   `process_instance_id` varchar(64) NULL COMMENT '关联的流程实例id，程序包 类型的节点才有值',
   `deviation` varchar(100) NULL COMMENT '偏离单号',
   `version_number` int DEFAULT NULL COMMENT '版本号',
   `status` int DEFAULT NULL COMMENT '业务状态',
   `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
   `is_deleted` int DEFAULT NULL,
   `create_time` datetime DEFAULT NULL COMMENT '创建时间',
   `create_user` bigint DEFAULT NULL COMMENT '创建人',
   `update_time` datetime DEFAULT NULL COMMENT '更新时间',
   `update_user` bigint DEFAULT NULL COMMENT '更新人',
   PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='程序节点目录';

DROP TABLE IF EXISTS `mdm_task_dispatch`;
CREATE TABLE `mdm_task_dispatch` (
   `id` bigint NOT NULL,
   `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
   `process_name` varchar(20) NULL COMMENT '工序名称',
   `process_no` varchar(100) NULL COMMENT '工序号',
   `machine_code` varchar(100) DEFAULT NULL COMMENT '设备编号/机床编号',
   `drawing_no` varchar(100) NULL COMMENT '零组件编号/图号',
   `process_edition` varchar(40) DEFAULT NULL COMMENT '工序版次，升版就是变更改该字段，需要保留历史记录',
   `craft_edition` varchar(40) DEFAULT NULL COMMENT '工艺版次',
   `drawing_no_edition` varchar(100) NULL COMMENT '图号版次',
   `product_model` varchar(100) NULL COMMENT '产品型号',
   `deviation` varchar(100) NULL COMMENT '偏离单号',

   `err_msg` varchar(200) NULL COMMENT '错误或者提示信息',
   `process_instance_id` varchar(64) NULL COMMENT '关联的流程实例id，流程发起后填充',
   `status` int DEFAULT NULL COMMENT '业务状态，1：初始化；2:流程已启动 3:重复派工;4，验证失败,5：启动异常',
   `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
   `is_deleted` int DEFAULT NULL,
   `create_time` datetime DEFAULT NULL COMMENT '创建时间',
   `create_user` bigint DEFAULT NULL COMMENT '创建人',
   `update_time` datetime DEFAULT NULL COMMENT '更新时间',
   `update_user` bigint DEFAULT NULL COMMENT '更新人',
   PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='任务派工表';

DROP TABLE IF EXISTS `mdm_nc_program`;
CREATE TABLE `mdm_nc_program` (
  `id` bigint NOT NULL,
  `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
  `nc_node_id` bigint DEFAULT NULL COMMENT '所属节点id，应该属于某个数控程序节点的下级',
  `bind_nc_node_id` bigint DEFAULT NULL COMMENT '绑定节点id，绑定节点与文件名同名，便于显示树结构',
  `code` varchar(100) NULL COMMENT '程序编号',
  `name` varchar(100) NOT NULL COMMENT '程序名称',
  `oss_name` varchar(100) NULL COMMENT 'oss中的文件名',
  `category` varchar(20) NULL COMMENT '文件分类',
  `process_name` varchar(20) NULL COMMENT '工序名称',
  `process_no` varchar(20) NULL COMMENT '工序号',
  `remark` varchar(100) NULL COMMENT '备注',
  `is_text_file` int DEFAULT NULL COMMENT '是否文本文件',
  `url` varchar(400) NOT NULL COMMENT '文件地址',
  `machine_code` varchar(100) DEFAULT NULL COMMENT '设备编号/机床编号',
  `drawing_no` varchar(100) NULL COMMENT '零组件编号/图号',
  `drawing_no_edition` varchar(100) NULL COMMENT '图号版次',
  `craft_edition` varchar(20) NULL COMMENT '工艺版次',
  `description` varchar(100) NULL COMMENT '描述',
  `is_cured` int DEFAULT NULL COMMENT '是否固化,1是;0否',
  `expire_date` date DEFAULT NULL COMMENT '到期时间,根据有效期时长计算而来',
  `process_edition` varchar(40) DEFAULT NULL COMMENT '工序版次，升版就是变更改该字段，需要保留历史记录',
  `is_last_edition` int NOT NULL COMMENT '是否最新版次，1：最新版次；0:历史版次，主要取该字段=1的数据，0是历史版次',
  `is_locked` int DEFAULT NULL COMMENT '锁定状态，1：锁定；0:正常',
  `is_test` int DEFAULT NULL COMMENT '是否测试程序，1：是；0:否',
  `version_number` int DEFAULT NULL COMMENT '版本号',
  `task_assign_time` datetime DEFAULT NULL COMMENT '程序的任务下发的时间（用于检查是否为重复的任务）',
  `status` int DEFAULT NULL COMMENT '业务状态',
  `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
  `is_deleted` int DEFAULT NULL,
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `create_user` bigint DEFAULT NULL COMMENT '创建人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `update_user` bigint DEFAULT NULL COMMENT '更新人',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='数控程序';


DROP TABLE IF EXISTS `mdm_flow_program_file`;
CREATE TABLE `mdm_flow_program_file` (
    `id` bigint NOT NULL,
    `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
    `process_instance_id` varchar(64) NOT NULL COMMENT '流程实例id',
    `name` varchar(100) DEFAULT NULL COMMENT '文件名',
    `program_name` varchar(100) DEFAULT NULL COMMENT '程序名/程序包名',
    `oss_name` varchar(400) DEFAULT NULL COMMENT 'oss文件名',
    `file_type` varchar(10) DEFAULT NULL COMMENT '文件类型(program/other)',
    `is_cured` int DEFAULT 0 COMMENT '是否固化的,1是;0否，流程发起时发现固化程序自动插入的为固化1',
    `status` int DEFAULT NULL COMMENT '业务状态',
    `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
    `is_deleted` int DEFAULT NULL,
    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
    `create_user` bigint DEFAULT NULL COMMENT '创建人',
    `update_time` datetime DEFAULT NULL COMMENT '更新时间',
    `update_user` bigint DEFAULT NULL COMMENT '更新人',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='流程程序文件';


DROP TABLE IF EXISTS `mdm_replace_program_file`;
CREATE TABLE `mdm_replace_program_file` (
     `id` bigint NOT NULL,
     `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
     `process_instance_id` varchar(64) NOT NULL COMMENT '流程实例id',
     `name` varchar(100) DEFAULT NULL COMMENT '文件名',
     `program_name` varchar(100) DEFAULT NULL COMMENT '程序名/程序包名',
     `oss_name` varchar(400) DEFAULT NULL COMMENT 'oss文件名',
     `temp_id` bigint NULL,
     `status` int DEFAULT NULL COMMENT '业务状态',
     `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
     `is_deleted` int DEFAULT NULL,
     `create_time` datetime DEFAULT NULL COMMENT '创建时间',
     `create_user` bigint DEFAULT NULL COMMENT '创建人',
     `update_time` datetime DEFAULT NULL COMMENT '更新时间',
     `update_user` bigint DEFAULT NULL COMMENT '更新人',
     PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='替换流程程序文件';


/**流程实例与数控程序关联表，记录创建时机：用户在程序编制节点手动关联*/
DROP TABLE IF EXISTS `mdm_process_prog_ref`;
CREATE TABLE `mdm_process_prog_ref` (
    `id` bigint NOT NULL,
    `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
    `process_instance_id` varchar(64) NOT NULL COMMENT '流程实例id',
    `nc_program_id` bigint DEFAULT NULL COMMENT '数控程序id',
    `process_definition_key` varchar(100) DEFAULT NULL COMMENT '流程定义key',
    `status` int DEFAULT NULL COMMENT '业务状态',
    `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
    `is_deleted` int DEFAULT NULL,
    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
    `create_user` bigint DEFAULT NULL COMMENT '创建人',
    `update_time` datetime DEFAULT NULL COMMENT '更新时间',
    `update_user` bigint DEFAULT NULL COMMENT '更新人',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='流程实例与程序关联表';

/**
  流程审批记录表，审批过程中记录
 */
DROP TABLE IF EXISTS `mdm_approve_record`;
CREATE TABLE `mdm_approve_record` (
   `id` bigint NOT NULL,
   `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
   `nc_program_id` bigint NULL COMMENT '程序id。未选择程序之前是null',
   `process_instance_id` varchar(64) DEFAULT NULL COMMENT '流程实例id',
   `process_definition_key` varchar(100) DEFAULT NULL COMMENT '流程定义key',
   `task_definition_key` varchar(100) DEFAULT NULL COMMENT '任务定义key',
   `task_name` varchar(100) DEFAULT NULL COMMENT '任务名称',
   `operate_time` datetime DEFAULT NULL COMMENT '审批时间',
   `operate_result` varchar(20) DEFAULT NULL COMMENT '审批结果',
   `user_id` bigint NOT NULL COMMENT '审批用户id',
   `user_nickname` varchar(100) NOT NULL COMMENT '审批用户姓名',
   `nc_node_id` bigint  NULL COMMENT '审批对应的程序包节点id',
   `comment` varchar(100) NULL COMMENT '审批备注',
   `status` int DEFAULT NULL COMMENT '业务状态',
   `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
   `is_deleted` int DEFAULT NULL,
   `create_time` datetime DEFAULT NULL COMMENT '创建时间',
   `create_user` bigint DEFAULT NULL COMMENT '创建人',
   `update_time` datetime DEFAULT NULL COMMENT '更新时间',
   `update_user` bigint DEFAULT NULL COMMENT '更新人',
   PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='数控程序审批记录';


DROP TABLE IF EXISTS `mdm_nc_program_approved`;
CREATE TABLE `mdm_nc_program_approved` (
   `id` bigint NOT NULL,
   `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
   `nc_node_id` bigint NOT NULL COMMENT '程序包名对应的nodeid',
   `programmer_id` bigint NOT NULL COMMENT '编程员用户ID',
   `title` varchar(200) NOT NULL COMMENT '流程标题',
   `program_name` varchar(100) NOT NULL COMMENT '程序名称',
   `status` int DEFAULT NULL COMMENT '业务状态',
   `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
   `is_deleted` int DEFAULT NULL,
   `create_time` datetime DEFAULT NULL COMMENT '创建时间',
   `create_user` bigint DEFAULT NULL COMMENT '创建人',
   `update_time` datetime DEFAULT NULL COMMENT '更新时间',
   `update_user` bigint DEFAULT NULL COMMENT '更新人',
   PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='数控程序审批表';



DROP TABLE IF EXISTS `mdm_nc_program_exchange`;
CREATE TABLE `mdm_nc_program_exchange` (
  `id` bigint NOT NULL,
  `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
  `name` varchar(100) NOT NULL COMMENT '程序名称',
  `nc_node_id` bigint DEFAULT NULL COMMENT '程序包名 的节点id',
  `status` int DEFAULT NULL COMMENT '业务状态',
  `exchange_type` int DEFAULT NULL COMMENT '交换类型,1:下发;2:固化(dnc回传)',
  `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
  `is_deleted` int DEFAULT NULL,
  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
  `create_user` bigint DEFAULT NULL COMMENT '创建人',
  `update_time` datetime DEFAULT NULL COMMENT '更新时间',
  `update_user` bigint DEFAULT NULL COMMENT '更新人',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='数控程序交换记录';



DROP TABLE IF EXISTS `mdm_dnc_back_fileold`;
CREATE TABLE `mdm_dnc_back_fileold` (
     `id` bigint NOT NULL,
     `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
     `nc_node_id` bigint NOT NULL COMMENT '程序包名 节点id',
     `confirm_time` datetime DEFAULT NULL COMMENT '确认时间',
     `oss_name` varchar(100) NULL COMMENT 'oss中的文件名',
     `url` varchar(400) NOT NULL COMMENT '文件地址',
     `status` int DEFAULT NULL COMMENT '业务状态',
     `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
     `is_deleted` int DEFAULT NULL,

     `create_time` datetime DEFAULT NULL COMMENT '创建时间',
     `create_user` bigint DEFAULT NULL COMMENT '创建人',
     `update_time` datetime DEFAULT NULL COMMENT '更新时间',
     `update_user` bigint DEFAULT NULL COMMENT '更新人',
     PRIMARY KEY (`id`) USING BTREE

) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='DNC回传文件记录';


DROP TABLE IF EXISTS `mdm_dnc_back_file`;
CREATE TABLE `mdm_dnc_back_file` (
    `id` bigint NOT NULL,
    `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
    `nc_node_id` bigint NOT NULL COMMENT '程序包名 节点id',
    `oss_name` varchar(100) NULL COMMENT 'oss中的文件名回传的zip文件名',
    `status` int DEFAULT NULL COMMENT '业务状态',
    `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
    `is_deleted` int DEFAULT NULL,

    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
    `create_user` bigint DEFAULT NULL COMMENT '创建人',
    `update_time` datetime DEFAULT NULL COMMENT '更新时间',
    `update_user` bigint DEFAULT NULL COMMENT '更新人',
    PRIMARY KEY (`id`) USING BTREE

) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='DNC回传文件记录新';



DROP TABLE IF EXISTS `mdm_file_locks`;
CREATE TABLE `mdm_file_locks` (
     `lock_id` int NOT NULL COMMENT '锁定id，固定1',
     `locked_by` varchar(100)  DEFAULT NULL COMMENT '锁定id',
     `lock_time` datetime DEFAULT NULL COMMENT '锁定时间',
     PRIMARY KEY (`lock_id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='文件监控锁定表';



DROP TABLE IF EXISTS `mdm_program_node`;
CREATE TABLE `mdm_program_node` (
   `id` bigint NOT NULL,
   `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
   `name` varchar(100) NOT NULL COMMENT '节点名称',
   `parent_id` bigint DEFAULT NULL COMMENT '上级节点ID',
   `parent_ids` varchar(200) DEFAULT NULL COMMENT '上级节点ID集合，id逗号分隔',
   `node_type` varchar(20) DEFAULT NULL COMMENT '10:普通节点（机构，机床）；60：程序包，70：程序文件',
   `program_file_id` bigint NULL COMMENT '关联的流程程序文件id，程序文件类型的节点才有值',

   `status` int DEFAULT NULL COMMENT '业务状态',
   `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
   `is_deleted` int DEFAULT NULL,
   `create_time` datetime DEFAULT NULL COMMENT '创建时间',
   `create_user` bigint DEFAULT NULL COMMENT '创建人',
   `update_time` datetime DEFAULT NULL COMMENT '更新时间',
   `update_user` bigint DEFAULT NULL COMMENT '更新人',
   PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='工控网程序节点';


DROP TABLE IF EXISTS `mdm_machine_back_file`;
CREATE TABLE `mdm_machine_back_file` (
     `id` bigint NOT NULL,
     `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
     `confirm_time` datetime DEFAULT NULL COMMENT '确认时间',
     `oss_name` varchar(100) NULL COMMENT 'oss中的文件名',
     `status` int DEFAULT NULL COMMENT '业务状态',
     `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
     `is_deleted` int DEFAULT NULL,
     `create_time` datetime DEFAULT NULL COMMENT '创建时间',
     `create_user` bigint DEFAULT NULL COMMENT '创建人',
     `update_time` datetime DEFAULT NULL COMMENT '更新时间',
     `update_user` bigint DEFAULT NULL COMMENT '更新人',
     PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='机床回传文件（已接受的）';

DROP TABLE IF EXISTS `mdm_machine_file`;
CREATE TABLE `mdm_machine_file` (
    `id` bigint NOT NULL,
    `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
    `name` varchar(100) NOT NULL COMMENT '文件名称',
    `dir_type` varchar(5) DEFAULT NULL COMMENT '目录类型：SEND/REC/TEMP',
    `machine_code` varchar(100) DEFAULT NULL COMMENT '机床编码',
    `file_create_time` datetime DEFAULT NULL COMMENT '文件创建时间',
    `file_modify_time` datetime DEFAULT NULL COMMENT '文件创建时间',
    `md5` varchar(32) DEFAULT NULL COMMENT 'md5 hex',
    `file_size` bigint DEFAULT NULL COMMENT '文件字节数',
    `determine_time` datetime DEFAULT NULL COMMENT '接受/拒绝的时间',
    `status` int DEFAULT NULL COMMENT '业务状态',
    `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
    `is_deleted` int DEFAULT NULL,
    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
    `create_user` bigint DEFAULT NULL COMMENT '创建人',
    `update_time` datetime DEFAULT NULL COMMENT '更新时间',
    `update_user` bigint DEFAULT NULL COMMENT '更新人',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='工控网机床文件';


DROP TABLE IF EXISTS `mdm_machine_file_change_his`;
CREATE TABLE `mdm_machine_file_change_his` (
    `id` bigint NOT NULL,
    `tenant_id` varchar(6) DEFAULT NULL COMMENT '所属租户',
    `oss_name` varchar(100) NOT NULL COMMENT '修改前oss文件名称（文件备份）',
    `oss_name_after` varchar(100) NOT NULL COMMENT '修改后的oss文件名称',
    `machine_file_id` bigint DEFAULT NULL COMMENT '修改文件的id(mdm_machine_file.id)',
    `status` int DEFAULT NULL COMMENT '业务状态',
    `create_dept` bigint DEFAULT NULL COMMENT '创建单位',
    `is_deleted` int DEFAULT NULL,
    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
    `create_user` bigint DEFAULT NULL COMMENT '创建人',
    `update_time` datetime DEFAULT NULL COMMENT '更新时间',
    `update_user` bigint DEFAULT NULL COMMENT '更新人',
    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='工控网机床文件修改历史';

